<mainmenu>

This  program converts the  output
your CD-ROM database and  converts
into the ISO 2709 format which you
can import into your CDS/ISIS data
base.

USAGE: Use  UP  or  DOWN arrows to
select

<dialog  >

	This option allows you to convert the
TAGGED Dailog output into iso 2709 format.

WARNING: This works for TAGGED output only.

<silver  >

	This option allows to convert any
database available from Silver Plotter
CD-ROM to iso 2709 format.

<duplicat>

	This option removes duplicates from
ISO 2709 file.  If you want to see in  more
number files combine all  the  files  using
DOS command
	copy input1+input2+...  output

and then give the output against input file

<lfs     >

	The CDS/ISIS Version 2.3 has a quirk,
that it expects a Line Feed character in the
81 column of each line. If any other database
does not require it you can as well remove it
using this option and vice versa.

<exit    >

  To exit into DOS.

<wanted  >

       Enter tag Numbers to be compared



<table   >

Enter the abbreviations used in the
CD-ROM Database from where you have
taken the output  and also the tags
in the  CDS/ISIS  database  against
each entry

For example:

AU		100
TI		200
SO		300
PY		400
AB		500
LA		600
FH		700
 .		 .
 .		 .
Press F10 after entry

<input   >

Enter the name of the Input
file which is the output of
of your CD-ROM Data base.

<output  >
Enter a file name
to collect the output of this
software which you should
use as a file to be imported
in the CDS/ISIS database
using ISISXCH option

<maxinfo >
	This table gives you guidelines
about the maximum length of each field
so that you could create/modify FDT in
your CDS/ISIS database

<end>
